和记平台

110Vdc 220Vac Standalone Parallal Power Inverter

HOT PRODUCTS > Parallel Inverter > 110Vdc 220Vac Standalone Parallal Power Inverter
和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱

110Vdc 220Vac Standalone Parallal Power Inverter

DC Input Range: 92to -142vdc;
Bypass Input:176-264VAC;
AC output: 220VAC(±5%) Can be Adjustable On the LCD Display;
Output Voltage Precision(V):220Vac ±1.5%
≥85% (Bypass Mode)
shared:
BWT110/220-1KVAS BWT110/220-2KVAS BWT110/220-3KVAS BWT110/220-5KVAS BWT110/220-6KVAS

BWT-DT2000 parallel inverter specially designed  to the application of reliability and cost-effective &  high safety power supply. It uses full (electrical) isolation inverters technology to convert direct current into high quality pure sinusoidal alternating current (AC),Rack mount type easy install in the cabinet.  

  It has the advantages of simple operation, low noise, no pollution, real-time data acquisition and remote communication, provides convenience  to the users of the system to implement network management and remote monitoring. The inverter is not only suitable for  Power and communication field, but also suitable for other places where  requirement of  high quality power supply.


Basic System Architecture

The following illustration shows the basic application for this inverter. It also includes the following devices to
have a complete running system:

Product Overview



【网站地图】【sitemap】