和记平台

Tower Pure Sine Wave Power Inverter With Charge Function

HOT PRODUCTS > Electric & Industry Power Inverter > Tower Pure Sine Wave Power Inverter With Charge Function
和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱

Tower Pure Sine Wave Power Inverter With Charge Function

Battery Rated Voltage: 12V/24V
Input Voltage Range: 73~138Vac/148~275Vac
Frequency: 50/60Hz
Output Wave: Pure sine Wave
Charge Current: 0-15A
shared:
BWT-AB300ML BWT-AB500ML BWT-BB700ML BWT-BB1000ML


With the double MCUs, the product provide different charge voltage and charfe current to realize chargemanagement for batteries of different types. Its mains supply preferred mode, energy-saving mode and battery preferred mode are all settable, thus makeing it easy to meet families. schools, streets, frontier defense, pasturing areas, industrial equipment, satellitecommunication equipment, military vehicle-born equipment, ambulances,police cars, ships, etc.


Basic System Architecture

The following illustration shows the basic application for this in MPPT charger.It also includes the following devices to 

have a complete running system:




和记平台·(中国)和记ag - 怡情博娱

①--LCD display

②-- ON/OFF button, function key

③-- Fan

④--RS232 communication interface(optional function)

⑤--Battery input terminal

⑥-- AC input socket

⑦-- AC output socket


【网站地图】【sitemap】