和记平台

5KVA Pure sine wave online UPS

HOT PRODUCTS > UPS > 5KVA Pure sine wave online UPS
和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱

5KVA Pure sine wave online UPS

Online UPS
Input voltage range:
120Vac~270Vac
Output voltage range:
46.5Vdc~53Vdc
Transfer Time:
Line mode to Battery mode 0ms
Line mode / Battery mode to Bypass mode 4ms
shared:
1. LCD display
2. Bypass indicator
3. Status indicator
4. Charging indicator
5. Fault indicator
6. Function keys (Please refer to operation chapter for the detailed operation)
7. AC input terminals
8. AC output terminals
9. Grounding terminal
10. Battery input
11. Circuit breaker
12. RS-232 communication port
13. USB communication port
14. EPO port (Emergency power off)
15. Parallel communication port (only for parallel model)
16. Current sharing port (only for parallel model)
17. Intelligent slot

blob.png

【网站地图】【sitemap】