和记平台

3.2KW MPPT Hybrid Inverter

HOT PRODUCTS > DC CONVERTER > 3.2KW MPPT Hybrid Inverter
和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱
  • 和记平台·(中国)和记ag - 怡情博娱

3.2KW MPPT Hybrid Inverter

This is a multi-function inverter/charger, combining functions of inverter, solar charger and battery charger to
offer uninterruptible power support with portable size. Its comprehensive LCD display offers user-configurable
and easy-accessible button operation such as battery charging current, AC/solar charger priority, and
acceptable input voltage based on different applications.
shared:
Pure sine wave inverter
Configurable input voltage range for home appliances and personal computers via LCD setting
Configurable battery charging current based on applications via LCD setting
Configurable AC/Solar Charger priority via LCD setting
Compatible to mains voltage or generator power
Auto restart while AC is recovering
Overload/ Over temperature/ short circuit protection
Smart battery charger design for optimized battery performance
Cold start function 


【网站地图】【sitemap】